-- Drop legacy cad_buildings snapshot table (replaced by gendesign_cad_buildings foreign table).
-- Idempotent.
BEGIN;

DROP TRIGGER IF EXISTS cad_buildings_set_geom_trg ON cad_buildings;
DROP TABLE IF EXISTS cad_buildings CASCADE;

COMMIT;
